LO HIGH RESOLUTION IMAGES

Image Incidence Emission Altitude (km) PP Lat PP Lon Corrected Res2 LO2-56-H2 74.98 0.46 47.47 4.09 21.23 0.680 LO2-58-H1 74.73 0.26 47.28 4.01 21.62 0.677 LO2-62-H3 78.97 1.09 50.64 4.82 15.63 0.726 LO2-64-H3 78.70 0.82 50.31 4.77 15.89 0.721 LO2-67-H2, H3 68.41 3.50 45.52 2.75 24.38 0.653 LO2-69-H3 68.16 3.53 45.57 2.70 24.62 0.654 LO2-70-H1, H2, H3 68.04 3.55 45.60 2.67 24.75 0.654 LO2-71-H3 67.91 3.58 45.63 2.65 24.87 0.655 LO2-72-H3 67.79 3.61 45.67 2.62 24.99 0.656 LO2-73-H1, H2 67.67 3.65 45.70 2.60 25.11 0.656 LO2-82-H3 61.16 1.70 50.11 1.03 24.53 0.718 LO2-83-H3 61.02 1.84 50.28 1.00 24.66 0.721 LO2-96-H1 70.20 0.29 40.79 2.51 -2.08 0.584 LO2-104-H3 68.61 0.65 41.14 2.16 -2.27 0.589 LO2-105-H3 68.50 0.77 41.18 2.13 -2.15 0.590 LO2-110-H2 67.93 1.35 41.41 2.01 -1.58 0.593 LO2-111-H1 67.81 1.46 41.46 1.99 -1.47 0.594 LO2-113-H2 62.28 1.22 46.70 0.69 -1.25 0.669 LO2-115-H2 62.03 1.48 47.03 0.64 -1.00 0.674 LO2-121-H3 60.67 1.28 49.16 0.32 -1.41 0.705 LO3-10-H1 75.98 0.95 59.07 2.82 34.95 0.847 LO3-12-H1 75.68 0.65 58.76 2.71 32.25 0.842 LO3-13-H3 75.54 0.51 58.62 2.66 35.39 0.840 LO3-14-H1 75.39 0.37 58.47 2.60 35.53 0.838 LO3-16-H2 75.09 0.22 58.19 2.49 35.82 0.834 LO3-20-H1 74.51 0.66 57.67 2.27 36.39 0.827 LO3-26-H1 66.91 3.79 56.09 -0.85 42.12 0.806 LO3-32-H1 66.09 3.96 56.39 -1.16 42.93 0.810 LO3-35-H3 64.45 20.41 56.84 -1.05 42.81 0.870 LO3-42-H3 79.63 17.64 58.49 3.12 20.73 0.880 LO3-44-H2, H3 71.41 3.81 51.73 0.69 21.70 0.743 LO3-46-H1, H2 71.17 3.80 51.66 0.59 27.35 0.742 LO3-54-H2 72.24 14.48 50.99 0.36 24.49 0.755 LO3-68-H1, H2, H3 72.21 7.50 49.60 0.30 20.99 0.717 LO3-70-H2, H3 71.19 7.54 49.33 -0.10 22.00 0.713 LO3-72-H2 67.08 22.92 49.86 -0.83 24.32 0.776

LO3-75-H1 81.27 0.29 56.48 3.79 6.77 0.810 LO3-81-H3 67.41 4.56 46.92 -1.61 13.40 0.674 LO3-82-H2 66.94 4.68 47.16 -1.80 13.87 0.678 LO3-86-H2 77.22 24.28 46.94 1.12 -1.60 0.738 LO3-88-H1, H3 76.94 24.27 46.70 1.11 -1.33 0.734 LO3-90-H2 76.67 24.26 46.46 1.01 -1.06 0.730 LO3-92-H1, H2 76.40 24.26 46.25 0.91 -0.80 0.727 LO3-94-H1, H3 75.48 10.42 45.42 0.92 -1.63 0.662 LO3-95-H1 75.36 10.42 45.34 0.87 -1.51 0.660 LO3-96-H2 75.23 10.41 45.26 0.83 -1.39 0.659 LO3-99-H2 74.87 10.41 45.04 0.69 -1.03 0.656 LO3-100-H3 74.75 10.41 44.97 0.65 -0.91 0.655 LO3-101-H1, H2 74.53 10.41 44.90 0.50 -0.79 0.654 LO3-111-H3 60.08 2.48 53.53 -4.99 4.88 0.768 LO3-112-H2, H3 71.41 36.39 43.95 -1.83 -8.20 0.783 LO3-113-H3 71.26 36.39 43.96 -1.88 -8.06 0.783 LO3-115-H3 70.98 36.39 43.98 -1.99 -7.78 0.783 LO3-122-H1 78.15 18.09 48.22 1.07 -21.91 0.727 LO3-125-H1, H3 72.65 0.24 45.71 -0.67 -19.98 0.655 LO3-126-H2 72.53 0.28 45.70 -0.72 -19.85 0.655 LO3-127-H1 72.41 0.36 45.69 -0.76 -19.74 0.655 LO3-128-H2 72.29 0.47 45.68 -0.81 -19.52 0.654 LO3-130-H2 72.05 0.70 45.67 -0.90 -19.39 0.654 LO3-131-H1 71.93 0.82 45.67 -0.95 -19.27 0.654 LO3-133-H2, H3 68.25 34.10 46.70 -3.46 -17.39 0.808 LO3-137-H1, H2 70.79 39.21 48.70 -2.92 -23.44 0.901 LO3-138-H1, H2 70.64 39.21 48.75 -2.98 -23.29 0.902 LO3-139-H1, H2 70.48 39.21 48.80 -3.05 -23.13 0.903 LO3-140-H1, H2 70.32 39.21 48.85 -3.11 -22.97 0.904 LO3-141-H1, H2 70.16 39.21 48.90 -3.17 -22.82 0.905 LO3-142-H2, H3 70.01 39.22 48.96 -3.23 -22.66 0.906 LO3-143-H1, H3 69.85 39.22 49.02 -3.29 -22.50 0.907 LO3-144-H1, H2 69.69 39.23 49.09 -3.35 -22.35 0.909 LO3-145-H1, H3 68.72 8.88 49.82 -2.70 -23.12 0.723 LO3-146-H1, H3 68.59 8.90 49.89 -2.75 -23.00 0.724 LO3-148-H1, H3 58.33 8.93 50.04 -2.85 -22.74 0.726 LO3-149-H1, H2 68.21 8.95 50.12 -2.90 -22.62 0.727 LO3-150-H2 68.08 8.97 50.20 -2.95 -22.49 0.728 LO3-151-H1, H2, H3 67.95 8.99 50.28 -2.99 -22.36 0.729

LO3-152-H3 67.82 9.02 50.37 -3.04 -22.24 0.731 LO3-153-H2, H3 67.34 2.13 51.11 -2.97 -23.51 0.733 LO3-154-H2, H3 67.21 2.19 51.21 -3.02 -23.38 0.734 LO3-156-H1 66.95 2.32 51.42 -3.12 -23.12 0.737 LO3-158-H1, H2 66.69 2.47 51.63 -3.21 -22.86 0.741 LO3-159-H2, H3 66.56 2.55 51.74 -3.26 -22.73 0.742 LO3-165-H2 79.03 18.01 54.51 1.66 -42.12 0.822 LO3-167-H2 78.74 18.00 54.24 1.55 -41.83 0.818 LO3-168-H2, H3 78.60 17.99 54.11 1.49 -41.59 0.816 LO3-170-H1, H3 78.31 17.99 53.85 1.38 -41.41 0.812 LO3-173-H1, H3 68.79 3.64 53.25 -3.25 -37.27 0.765 LO3-174-H1 68.65 3.68 53.34 -3.30 -37.13 0.766 LO3-176-H1 68.37 3.75 53.53 -3.41 -35.85 0.769 LO3-178-H2 68.10 3.86 53.74 -3.51 -36.58 0.772 LO3-181-H1, H2, H3 73.27 19.57 53.39 -2.22 -43.50 0.812 LO3-182-H3 73.13 19.57 53.39 -2.28 -43.35 0.812 LO3-183-H1, H2 72.99 19.58 53.40 -2.33 -43.21 0.812 LO3-184-H2 72.85 19.58 53.41 -2.38 -43.07 0.813 LO3-186-H1 72.55 13.08 54.02 -2.35 -44.53 0.795 LO3-188-H2 72.27 13.08 54.06 -2.46 -44.25 0.796 LO3-189-H1, H2 72.12 13.09 54.09 -2.51 -44.11 0.796 LO3-191-H3 71.84 13.10 54.15 -2.62 -43.83 0.797 LO3-194-H1 71.42 13.13 54.27 -2.78 -43.41 0.799 LO3-195-H2 71.28 13.14 54.31 -2.83 -43.26 0.799 LO3-196-H2 71.13 13.16 54.36 -2.88 -43.12 0.800 LO3-197-H1, H2 70.99 13.17 54.44 -2.94 -42.98 0.801 LO3-200-H2, H3 70.57 13.23 54.58 -3.10 -42.56 0.804 LO3-205-H2 69.29 30.90 56.25 -2.16 -44.79 0.940 LO3-209-H2 68.62 30.94 56.67 -2.40 -44.12 0.948 LO3-211-H2 68.28 30.96 56.91 -2.52 -43.79 0.952 LO5-63-H2 67.48 30.95 99.44 -0.37 32.81 1.665 LO5-70-H2 69.57 12.74 113.14 17.30 26.33 1.665 LO5-105-H2, H3 71.06 5.21 131.45 25.09 2.95 1.895 LO5-107-H1 71.24 6.90 139.77 28.10 3.21 2.022 LO5-108-H3 72.21 10.73 97.46 -0.05 -1.10 1.424 LO5-112-H3 70.61 20.94 97.57 -0.14 -1.11 1.500 LO5-118-H2 72.90 15.38 114.04 -13.74 -4.11 1.698 LO5-125-H2 81.10 6.16 220.06 -42.90 -11.70 3.180 LO5-126-H2 80.93 5.57 217.25 -42.32 -11.61 3.136

LO5-128-H1 80.59 4.37 211.56 -41.12 -11.44 3.048 LO5-130-H2 73.26 8.29 236.01 49.31 -2.74 3.426 LO5-147-H1, H2, H3 71.49 16.42 100.94 6.73 -18.25 1.510 LO5-138-H3 73.73 1.54 104.04 -7.48 -16.83 1.494 LO5-200-H1, H2, H3 73.99 3.31 132.32 24.12 -47.30 1.903

LO MEDIUM RESOLUTION IMAGES

Image Incidence Emission Altitude (km) PP Lat PP Lon Corrected Res2 LO3-78-M 59.84 74.44 56.80 -10.29 26.51 24.334 LO3-85-M 77.86 59.74 49.07 4.94 -0.34 11.180 LO3-111-M 60.08 2.48 53.53 -4.99 4.88 6.144 LO3-113-M 71.26 36.39 43.96 -1.88 -8.06 6.262 LO3-185-M 72.69 13.09 54.00 -2.30 -44.67 6.357 LO3-189-M 72.12 13.09 54.09 -2.51 -44.11 6.368 LO3-193-M 71.56 13.12 54.23 -2.72 -43.55 6.385 LO3-200-M 70.57 13.23 54.58 -3.10 -42.56 6.430 LO5-70-M 69.57 12.74 113.14 17.30 26.33 13.322 LO5-118-M 72.90 15.38 114.04 -13.74 -4.11 13.584 LO5-147-M 71.49 16.42 100.94 6.73 -18.25 12.084